07501500

2250

3000

3750

4500

5250

6000

6750

7500

8250

9000

9750

0

Sample ACF

PHI07150

14300

21450

28600

35750

42900

50050

57200

64350

71500

78650

85800

92950

0

1

Sample Path

PHI-1.0-0.8-0.6-0.4-0.20.00.20.40.60.81.0

0.25

0.50

Posterior Density