05050

10100

15150

-7.0

-6.5

-6.0

-5.5

B005050

-1.0

-0.5 0.0

B105050

-1 0

B205050

-1 0 1

B305050

0

1

B405050

0.5

1.0

B505050

0.5 1.0 1.5

B605050

0

1

B705050

0.00

0.25

0.50

0.75

1.00

B8