-7.0-6.5-6.0-5.5

0.5 1.0 1.5 2.0

Density

B0-1.0-0.50.0

1

2

B1-2-10

0.5 1.0

B2-101

0.5 1.0 1.5

B301

0.5 1.0 1.5

B40.00.51.0

1 2 3

B50.00.51.01.5

1

2

B601

0.5 1.0 1.5

B70.00.51.0

1 2 3

B8