0300600900

0.5

1.0

Correlogram

B00300600900

0

B10300600900

0

1

B20300600900

0

1

B30300600900

0

1

B40300600900

0

1

B50300600900

0

1

B60300600900

0

1

B70300600900

0

1

B8