01020304050

0

1

Sample ACF

Mu01020304050

0

Sigma^2

01450

2900

4350

5800

7250

8700

1.05

1.10

Sample Path

Mu01450

2

3

1.000

1.025

1.050

1.075

1.100

10 20 30

Posterior Density

Mu1.01.52.02.53.0

0.5 1.0 1.5